text -1 100 This is the health cover
text -1 110 mini screen button.

text -1 140 When you click on this button the areas
text -1 150 that have a health centre within range
text -1 160 are displayed as normal. The areas out of
text -1 170 range of a health centre are dark green.

text -1 190 Remember, health centres take three
text -1 200 months to become active.
